Title: Activity: First Steps with Jupyter Notebooks
Course: Learning path for (data) librarians: Technical skills are the bridge to reproducible research > Section: Unit 3: The technical aspects

This activity introduces the participants to the basic concepts of the Jupyter notebooks, one of the most popular virtual lab notebook formats today. It guides the participant through the process of using an online service to open an existing notebook, execute its code, and modify it according to set out requirements.

There are no prerequisites for taking this exercise, only access to a web browser.

The activity can be attempted an unlimited number of times, with a delay of at least 3 days between subsequent attempts.